en-us	Dashboard Activity

en-us	(from %s to %s)

en-us	Active cart

en-us	How long (in minutes) a cart is to be considered as active after the last recorded change (default: 30 min).

en-us	Online visitor

en-us	How long (in minutes) a visitor is to be considered as online after their last action (default: 30 min).

en-us	Abandoned cart (min)

en-us	How long (in hours) after the last action a cart is to be considered as abandoned (default: 24 hrs).

en-us	hrs

en-us	Abandoned cart (max)

en-us	How long (in hours) after the last action a cart is no longer to be considered as abandoned (default: 24 hrs).

en-us	Check in one glance what is happening on your store with a list of KPI on your dashboard.

en-us	Activity overview

en-us	Online Visitors

en-us	in the last %d minutes

en-us	Active Shopping Carts

en-us	Currently Pending

en-us	Return/Exchanges

en-us	Out of Stock Products

en-us	New Messages

en-us	Product Reviews

en-us	Customers & Newsletters

en-us	New Customers

en-us	New Subscriptions

en-us	Total Subscribers

en-us	Traffic

en-us	Link to your Google Analytics account

en-us	Visits

en-us	Unique Visitors

en-us	Traffic Sources