en-us	Your shop is in debug mode.

en-us	Your shop is in maintenance.

en-us	Your visitors and customers cannot access your shop while in maintenance mode.%s To manage the maintenance settings, go to Shop Parameters > Maintenance tab.

en-us	No new order for now :(

en-us	No new customer for now :(

en-us	No new message for now.

en-us	registered

en-us	Orders[1][/1]

en-us	Customers[1][/1]

en-us	Messages[1][/1]

en-us	from

en-us	All the PHP errors and messages are displayed. When you no longer need it, [1]turn off[/1] this mode.

en-us	Your store is in debug mode.

en-us	Your store is in maintenance mode.

en-us	Your visitors and customers cannot access your store while in maintenance mode.

en-us	To manage the maintenance settings, go to Shop Parameters > General > Maintenance tab.

en-us	Admins can access the store front office without storing their IP.

en-us	An error occurred while updating new window property.

en-us	An error occurred while updating the new window property for this object.

en-us	Have you checked your [1][2]abandoned carts[/2][/1]?[3]Your next order could be hiding there!

en-us	Are you active on social media these days?

en-us	Seems like all your customers are happy :)