en-us	You can choose to keep your images stored in the previous system. There's nothing wrong with that.

en-us	After moving all of your product images, set the "Use the legacy image filesystem" option above to "No" for best performance.

en-us	Be careful! Depending on the options selected, former manually uploaded thumbnails might be erased and replaced by automatically generated thumbnails.

en-us	Also, regenerating thumbnails for all existing images can take several minutes, please be patient.

en-us	If you delete this image format, the theme won't be able to use it anymore. This will result in a degraded experience on your front office.

en-us	Delete the images linked to this image setting

en-us	Regenerate thumbnails for the selected images? With the "erase" option enabled, the previously selected thumbnails will be deleted.

en-us	Current theme is unavailable. Please check your theme's directory name ("%s") and permissions.

en-us	Duplicate images were found when moving the product images. This is likely caused by unused demonstration images. Please make sure that the folder %folder% only contains demonstration images, and then delete it.

en-us	Incorrect value for the selected JPEG image compression.

en-us	Incorrect value for the selected PNG image compression.

en-us	Incorrect value for the selected WebP image compression.

en-us	Source file does not exist or is empty (%filepath%)

en-us	Failed to resize image file (%filepath%)

en-us	Failed to resize image file to high resolution (%filepath%)

en-us	Original image is corrupt (%filename%) for product ID %id% or bad permission on folder.

en-us	Original image is missing or empty (%filename%) for product ID %id%

en-us	Cannot write images for this type: %1$s. Please check the %2$s folder's writing permissions.

en-us	Only part of the images have been regenerated. The server timed out before finishing.

en-us	Server timed out. The watermark may not have been applied to all images.

en-us	Cannot write "No picture" image to %s images folder. Please check the folder's writing permissions.

en-us	Error: Your server configuration is not compatible with the new image system. No images were moved.

en-us	Not all images have been moved. The server timed out before finishing. Click on "%move_images_label%" again to resume the moving process.

en-us	Error: Some -- or all -- images cannot be moved.

en-us	After modification, do not forget to regenerate thumbnails

en-us	Make sure the theme you use doesn't rely on this image format before deleting it.

en-us	An error occurred. The information "%s" is missing.

en-us	An error occurred. The template "%s" is missing.

en-us	An error occurred while uploading the favicon: cannot copy file "%s" to folder "%s".

en-us	Your theme has been correctly exported: %path%

en-us	The page Category cannot be moved here.

en-us	Your RTL stylesheets has been generated successfully

en-us	Your theme has been correctly reset to its default settings. You may want to regenerate your images. See the Improve > Design > Images Settings screen for the '%regenerate_label%' button.

en-us	There is already a theme %theme_name% in your themes folder. Remove it if you want to continue.

en-us	Failed to delete theme. Make sure you have permissions and theme is not used.

en-us	Cannot adapt theme to RTL languages.

en-us	This name already exists.

en-us	Invalid file format.

en-us	Warning: if no email logo is available, the main logo will be used instead.